== Why is this an issue?

Subprocedures that aren't called from anywhere in the codebase are dead code, which can only distract and possibly confuse developers during maintenance.  Therefore, unused subprocedures should be removed.


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Remove subprocedure "XXX"; it is unused.


'''
== Comments And Links
(visible only on this page)

=== is related to: S1144

endif::env-github,rspecator-view[]
