== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

With the default threshold of 3:


[source,php]
----
function myFunction(){ // Noncompliant as there are 4 return statements
  if (condition1) {
    return true;
  } else {
    if (condition2) {
      return false;
    } else {
      return true;
    }
  }
  return false;
}
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../parameters.adoc[]

include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
