== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

[source,python]
----
a = False
if a:  # Noncompliant
    doSomething()  # never executed

n = None

if not n:  # Noncompliant; n is None, which is always equivalent to "False" in a condition, "doSomethingElse()" is never evaluated
    doSomething()
else:
    doSomethingElse()  # never executed
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::../highlighting.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
