== Why is this an issue?

Cognitive Complexity is a measure of how hard the control flow of a method is to understand. Methods with high Cognitive Complexity will be difficult to maintain.

include::../see.adoc[]
ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Refactor this {0} to reduce its Cognitive Complexity from {1} to the {2} allowed.


Where {0} is the name of the syntax being analyzed, {1} the cognitive complexity and {2} the maximum authorized complexity.


=== Parameters

.threshold
****

----
15
----

The maximum authorized complexity.
****
.propertyThreshold
****

----
3
----

The maximum authorized complexity in a property.
****


include::../highlighting.adoc[]

endif::env-github,rspecator-view[]
