== Why is this an issue?

Some tools work better when files end with an empty line.

This rule simply generates an issue if it is missing.


For example, a Git diff looks like this if the empty line is missing at the end of the file:

----
+class Test 
+{
+}
\ No newline at end of file
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
