== Why is this an issue?

Each program should contain an initial section of ``++H*++`` comments lines, which includes a copyright and/or license statement. This rule must be fed with the header text that is expected in the header.

=== Compliant solution

[source,rpg]
----
     H*  Copyright (C) 2008-2013 SonarSource
     H*  mailto:contact AT sonarsource DOT com
     H*  
     H*  SonarQube is free software; you can redistribute it and/or
     H*  modify it under the terms of the GNU Lesser General Public
     H*  License as published by the Free Software Foundation; either
     H*  version 3 of the License, or (at your option) any later version.
     H*  
     H*  SonarQube is distributed in the hope that it will be useful,
     H*  but WITHOUT ANY WARRANTY; without even the implied warranty of
     H*  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
     H*  Lesser General Public License for more details.
     H*  
     H*  You should have received a copy of the GNU Lesser General Public License
     H*  along with this program; if not, write to the Free Software Foundation,
     H*  Inc., 51 Franklin Street, Fifth Floor, Boston, MA  02110-1301, USA.                                         
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

=== Parameters

.headerFormat
****

Expected copyright and license header. Should not include positions 1 to 7.
****
.isRegularExpression
****

----
false
----

Whether the headerFormat is a regular expression
****


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
