The cyclomatic complexity of a paragraph should not exceed a defined threshold. Complex code can perform poorly and will in any case be difficult to understand and therefore to maintain.


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::parameters.adoc[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
