The cyclomatic complexity of a function, procedure or property should not exceed a defined threshold. Complex code can perform poorly and will in any case be difficult to understand and therefore to maintain.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

include::parameters.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
