The ``++cgi.force_redirect++`` _php.ini_ configuration is on by default, and it prevents unauthenticated access to scripts when PHP is running as a CGI. Unfortunately, it must be disabled on IIS, OmniHTTPD and Xitami, but in all other cases it should be on.


This rule raises an issue when when ``++cgi.force_redirect++`` is explicitly disabled.


== Noncompliant Code Example

[source,php]
----
; php.ini
cgi.force_redirect=0  ; Noncompliant
----


== See

* https://owasp.org/Top10/A05_2021-Security_Misconfiguration/[OWASP Top 10 2021 Category A5] - Security Misconfiguration
* https://www.owasp.org/index.php/Top_10-2017_A6-Security_Misconfiguration[OWASP Top 10 2017 Category A6] - Security Misconfiguration
* https://cwe.mitre.org/data/definitions/305[MITRE, CWE-305] - Authentication Bypass by Primary Weakness



ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]
endif::env-github,rspecator-view[]
