== Ask Yourself Whether

* size limits are not defined for the different resources of the web application.
* the web application is not protected by https://en.wikipedia.org/wiki/Rate_limiting[rate limiting] features.
* the web application infrastructure has limited resources.

There is a risk if you answered yes to any of those questions.
