=== Parameters

.fileUploadSizeLimit
****
_integer_

----
8000000
----

The maximum size of HTTP requests handling file uploads (in bytes)
****
.standardSizeLimit
****
_integer_

----
2000000
----

The maximum size of regular HTTP requests (in bytes)
****
