==== Noncompliant code example

[source,vbnet,diff-id=1,diff-type=noncompliant]
----
Dim start = DateTime.Now ' First call, on March 26th 2:59 am
' Method to be benchmarked

Console.WriteLine($"{CInt((DateTime.Now - start).TotalMilliseconds)} ms") ' Second call happens 2 minutes later but `Now` is March 26th, 4:01 am as there's a shift to summer time
----

==== Compliant solution

[source,vbnet,diff-id=1,diff-type=compliant]
----
Dim stopWatch = Stopwatch.StartNew() ' Compliant
' Method to be benchmarked
stopWatch.Stop()

Console.WriteLine($"{stopWatch.ElapsedMilliseconds} ms")
----