It is recommended to restrict access to remote administration services to only
trusted IP addresses. In practice, trusted IP addresses are those held by system
administrators or those of https://aws.amazon.com/quickstart/architecture/linux-bastion/?nc1=h_ls[bastion-like] servers.
