== Why is this an issue?

include::../description.adoc[]

[source,vbnet]
----
Imports System.Reflection

Dim dynClass = Type.GetType("MyInternalClass")
' Sensitive. Using BindingFlags.NonPublic will return non-public members
Dim bindingAttr As BindingFlags = BindingFlags.NonPublic Or BindingFlags.Static
Dim dynMethod As MethodInfo = dynClass.GetMethod("mymethod", bindingAttr)
Dim result = dynMethod.Invoke(dynClass, Nothing)
----

include::../resources.adoc[]


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
