Throwing such general exceptions as ``++Exception++``, ``++SystemException++``, ``++ApplicationException++``, ``++IndexOutOfRangeException++``, ``++NullReferenceException++``, ``++OutOfMemoryException++`` and ``++ExecutionEngineException++`` prevents calling methods from handling true, system-generated exceptions differently than application-generated errors. 

== Noncompliant Code Example

----
Public Sub DoSomething(obj As Object)
  If obj Is Nothing Then
    ' Noncompliant
    Throw New NullReferenceException("obj")
  End If
  ' ...
End Sub
----

== Compliant Solution

----
Public Sub DoSomething(obj As Object)
  If obj Is Nothing Then
    Throw New ArgumentNullException("obj")
  End If
  ' ...
End Sub
----

include::../see.adoc[]

ifdef::rspecator-view[]
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::rspecator-view[]
