=== On 2017-08-17T17:36:38Z Pierre-Yves Nicolas Wrote:
\[~jeanchristophe.collet] I moved the description from RSPEC-1147 here. The only difference is the addition of the second link in the "See" section: CERT, ERR09-J. Please check that it makes sense.

include::../comments-and-links.adoc[]
