``++CASE++`` structures with a large set of ``++WHEN++`` clauses are difficult to understand and maintain, and should be refactored to include fewer ``++WHEN++`` clauses.

ifdef::rspecator-view[]
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::rspecator-view[]
