== Ask Yourself Whether

* the PID of the process to which the signal will be sent is coming from an untrusted source. It could for example come from a world-writable file.
* users who are asking for the signal to be sent might not have the permission to send those signals.

There is a risk if you answered yes to any of those questions.
