include::../description.adoc[]

include::../noncompliant.adoc[]

== Exceptions

When a block contains a comment, this block is not considered to be empty unless it is a ``++synchronized++`` block. ``++synchronized++`` blocks are still considered empty even with comments because they can still affect program flow.
