The PSR2 standard recommends listing modifiers in the following order to improve the readability of PHP source code:


. final or abstract
. public or protected or private
. static

== Noncompliant Code Example

----
static protected $foo;
... 
public static final function bar(){...}
----

== Compliant Solution

----
protected static $foo;
... 
final public static function bar(){...}
----
