== Why is this an issue?

Extra semicolons are usually introduced by mistake, for example because:

* It was meant to be replaced by one more property declaration, but this was forgotten.
* There was a typo which lead the semicolon to be doubled, i.e. ``++;;++``.


ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
