== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

With a maximum number of 4 parameters:

[source,flex]
----
public function addData(p1 : int, p2 : int, p3 : int, p4 : int, p5 : int): void  { 
...
}
----

=== Compliant solution

[source,flex]
----
public function addData(p1 : int, p2 : int, p3 : int, p4 : int): void  { 
...
}
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

=== Parameters

.max
****

----
7
----

Maximum authorized number of parameters
****


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
