== Why is this an issue?

A long parameter list can indicate that a new structure should be created to wrap the numerous parameters or that the function or procedure is doing too many things.

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

=== Parameters

.max
****

----
10
----

Maximum authorized number of parameters
****


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
