=== Parameters

.maxStackConsumptionFactor
****

----
TBD
----

An indicator approximately proportional to how quickly the stack grows relative to the input size. An issue will be reported if the value for a regex exceeds the maximum set here. Setting this to 0 will cause an issue to be reported for all regular expressions with non-constant stack consumption.
****
