Multi-line comments are more readable when each line is aligned using the "*" character. At most one violation is created for each comment


== Noncompliant Code Example

[source,sql]
----
/*
this line is not aligned and ugly Non-Compliant
no violation is created on this line, even though is it also bad
 */

/* this is Compliant */
----


== Compliant Solution

[source,sql]
----
/*
 * this is much better Compliant
 */

/* this is Compliant */
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::message.adoc[]

endif::env-github,rspecator-view[]
