== Why is this an issue?

It is good practice to provide values for all columns in a table, even the ``++NULLABLE++`` ones and the ones that provide default values.


ifdef::env-github,rspecator-view[]
'''
== Comments And Links
(visible only on this page)

=== relates to: S3618

=== relates to: S3620

endif::env-github,rspecator-view[]
