== Why is this an issue?

Having functions and procedures which take too many parameters decreases the code's readability and usability. It is likely that such a function/procedure is not modular enough, and should be split into several smaller ones.

=== Noncompliant code example

With the default threshold of 10:

[source,sql]
----
SET SERVEROUTPUT ON

CREATE FUNCTION sumWithTooManyParameters( -- Noncompliant, too many parameters
  a1 PLS_INTEGER,
  a2 PLS_INTEGER,
  a3 PLS_INTEGER,
  a4 PLS_INTEGER,
  a5 PLS_INTEGER,
  a6 PLS_INTEGER,
  a7 PLS_INTEGER,
  a8 PLS_INTEGER,
  a9 PLS_INTEGER,
  a10 PLS_INTEGER,
  a11 PLS_INTEGER
  )
  RETURN PLS_INTEGER AS
BEGIN
  RETURN a1 + a2 + a3 + a4 + a5 + a6 + a7 + a8 + a9 + a10 + a11;
END;
/

BEGIN
  DBMS_OUTPUT.PUT_LINE('Sum is ' || sumWithTooManyParameters(1, 2, 3, 4, 5, 6, 7, 8, 9, 10, 11));
END;
/

DROP FUNCTION sumWithTooManyParameters;
----

=== Compliant solution

[source,sql]
----
SET SERVEROUTPUT ON

CREATE FUNCTION sumCorrected(n PLS_INTEGER) RETURN PLS_INTEGER AS -- Compliant
BEGIN
  RETURN (1 + n)*(n / 2);
END;
/

BEGIN
  DBMS_OUTPUT.PUT_LINE('Sum is ' || sumCorrected(11));
END;
/

DROP FUNCTION sumCorrected;
----

[source,sql]
----
----

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

=== Parameters

.parameters
****

----
10
----

The maximum number of function and procedure parameters allowed.
****


'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
