If a ``private`` field is declared but not used in the program, it can be considered dead code and should therefore be removed. This will improve maintainability because developers will not wonder what the variable is used for.

Note that this rule does not take reflection into account, which means that issues will be raised on ``private`` fields that are only accessed using the reflection API.

== Noncompliant Code Example

----
public class MyClass {
  private int foo = 42;

  public int compute(int a) {
    return a * 42;
  }

}
----

== Compliant Solution

----
public class MyClass {
  public int compute(int a) {
    return a * 42;
  }
}
----

== Exceptions

The Java serialization runtime associates with each serializable class a version number, called ``serialVersionUID``, which is used during deserialization to verify that the sender and receiver of a serialized object have loaded classes for that object that are compatible with respect to serialization.
A serializable class can declare its own ``serialVersionUID`` explicitly by declaring a field named ``serialVersionUID`` that must be static, final, and of type long. By definition those ``serialVersionUID`` fields should not be reported by this rule:

----
public class MyClass implements java.io.Serializable {
  private static final long serialVersionUID = 42L;
}
----

Moreover, this rule doesn't raise any issue on annotated fields.
