== Why is this an issue?

Because of the way it's architected, Internet Explorer 9 and below has hard limits on the size and complexity of the stylesheets it can support. Stylesheet nesting may only go 4 levels deep. Anything beyond those limits won't be suppported. 

ifdef::env-github,rspecator-view[]

'''
== Comments And Links
(visible only on this page)

=== on 16 Aug 2016, 21:33:38 Ann Campbell wrote:
Closing because the limit is gone in IE 10 & > & marketshare of impared browsers is quite low.


endif::env-github,rspecator-view[]
