== Why is this an issue?

include::../description.adoc[]

include::../noncompliant.adoc[]

include::../compliant.adoc[]

== Resources

* https://owasp.org/Top10/A02_2021-Cryptographic_Failures/[OWASP Top 10 2021 Category A2] - Cryptographic Failures
* https://owasp.org/www-project-top-ten/2017/A6_2017-Security_Misconfiguration[OWASP Top 10 2017 Category A6] - Security Misconfiguration
* https://cwe.mitre.org/data/definitions/326[MITRE, CWE-326] - Inadequate Encryption Strength
* https://cwe.mitre.org/data/definitions/327[MITRE, CWE-327] - Use of a Broken or Risky Cryptographic Algorithm
* https://wiki.sei.cmu.edu/confluence/x/hDdGBQ[CERT, MSC61-J.] - Do not use insecure or weak cryptographic algorithms
* https://www.sans.org/top25-software-errors/#cat3[SANS Top 25] - Porous Defenses
* Derived from FindSecBugs rule https://h3xstream.github.io/find-sec-bugs/bugs.htm#DES_USAGE[DES / DESede Unsafe]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
