:language_std_outputs: Console

== Why is this an issue?

include::../description.adoc[]

=== Exceptions

The rule doesn't raise an issue for:

* Console Applications
* Calls in methods decorated with `[Conditional ("DEBUG")]`
* Calls included in DEBUG preprocessor branches (``++#if DEBUG++``)

=== Code examples

The following noncompliant code:

[source,csharp,diff-id=1,diff-type=noncompliant]
----
public class MyClass
{
    private void DoSomething()
    {
        // ...
        Console.WriteLine("My Message"); // Noncompliant
        // ...
    }
}
----

Could be replaced by:

[source,csharp,diff-id=1,diff-type=compliant]
----

public class MyClass
{
    private readonly ILogger _logger;

    // ...

    private void DoSomething()
    {
        // ...
        _logger.LogInformation("My Message");
        // ...
    }
}
----


== Resources

* https://owasp.org/Top10/A09_2021-Security_Logging_and_Monitoring_Failures/[OWASP Top 10 2021 Category A9] - Security Logging and Monitoring Failures

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

=== on 30 Aug 2018, 15:48:10 Nicolas Harraudeau wrote:
Previously RSPEC-2556

See Gendarme DisableDebuggingCodeRule

include::../comments-and-links.adoc[]

endif::env-github,rspecator-view[]
