== Why is this an issue?

When the value of a ``++LIKE++`` clause starts with '%', '[...]' or '_', indexes on the searched column are ignored, and a full table scan is performed instead.

include::../noncompliant.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

endif::env-github,rspecator-view[]
