ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

=== Message

Do not check floating point [in]equality with exact values, use [a range | `FloatingPointTypeName.IsXXX()` | `IsXXX()`] instead.

'''
== Comments And Links
(visible only on this page)

include::comments-and-links.adoc[]

endif::env-github,rspecator-view[]
