=== Standards

* OWASP - https://owasp.org/Top10/A03_2021-Injection/[Top 10 2021 Category A3 - Injection]
* OWASP - https://owasp.org/Top10/A09_2021-Security_Logging_and_Monitoring_Failures/[Top 10 2021 Category A9 - Security Logging and Monitoring Failures]
* OWASP - https://owasp.org/www-project-top-ten/2017/A1_2017-Injection[Top 10 2017 Category A1 - Injection]
* OWASP - https://owasp.org/www-project-top-ten/2017/A10_2017-Insufficient_Logging%2526Monitoring[Top 10 2017 Category A10 - Insufficient Logging & Monitoring]
* CWE - https://cwe.mitre.org/data/definitions/20[CWE-20 - Improper Input Validation]
* CWE - https://cwe.mitre.org/data/definitions/117[CWE-117 - Improper Output Neutralization for Logs]