== Why is this an issue?

include::../description.adoc[]

=== Noncompliant code example

Flask-SQLAlchemy

[source,python]
----
def configure_app(app):
    app.config['SQLALCHEMY_DATABASE_URI'] = "postgresql://user:@domain.com" # Noncompliant
----

Django

[source,python]
----
# settings.py

DATABASES = {
    'postgresql_db': {
        'ENGINE': 'django.db.backends.postgresql',
        'NAME': 'quickdb',
        'USER': 'sonarsource',
        'PASSWORD': '', # Noncompliant
        'HOST': 'localhost',
        'PORT': '5432'
    }
}
----

mysql/mysql-connector-python

[source,python]
----
from mysql.connector import connection

connection.MySQLConnection(host='localhost', user='sonarsource', password='')  # Noncompliant
----

=== Compliant solution

Flask-SQLAlchemy

[source,python]
----
def configure_app(app, pwd): 
    app.config['SQLALCHEMY_DATABASE_URI'] = f"postgresql://user:{pwd}@domain.com" # Compliant
----

Django

[source,python]
----
# settings.py
import os

DATABASES = {
    'postgresql_db': {
        'ENGINE': 'django.db.backends.postgresql',
        'NAME': 'quickdb',
        'USER': 'sonarsource',
        'PASSWORD': os.getenv('DB_PASSWORD'),      # Compliant
        'HOST': 'localhost',
        'PORT': '5432'
    }
}
----


mysql/mysql-connector-python

[source,python]
----
from mysql.connector import connection
import os

db_password = os.getenv('DB_PASSWORD')
connection.MySQLConnection(host='localhost', user='sonarsource', password=db_password)  # Compliant
----

include::../see.adoc[]

ifdef::env-github,rspecator-view[]

'''
== Implementation Specification
(visible only on this page)

include::../message.adoc[]

'''
== Comments And Links
(visible only on this page)

include::../comments-and-links.adoc[]
endif::env-github,rspecator-view[]
